0 10 20 30 40 50 60 Centrality (%) 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

10000

Events

V0M trigger fired

ALICE = 5.02 TeV NNs Pb, −Pb

ALI-PUB-569753

ALI-PUB-569753